  ▄▄▄▄▄▄▄▄▄▄▄▄▄
  BETTING RATIO
  ▀▀▀▀▀▀▀▀▀▀▀▀▀

  This setting is used in conjunction with the
  "BET MAX AT :" setting. It determines the
  number of UNITS to be bet.

  When your count is less than the "BET MAX AT"
  value, 1 UNIT will always be bet. When your count
  is greater than or equal to the "BET MAX AT" value,
  that value will be bet (measured in UNITS).

  If the "Bet = True Count" setting is set to 'Y'es,
  the "Bet Max At" setting is NOT used. Instead the
  betting ratio will determine the maximum allowed bet
  size.


  TECHNICAL NOTES:
  ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀

  ■ The maximum setting is a 1 to 20 unit betting
    ratio.

  ■ Most count systems are compared against each
    other on the 1 to 8 unit betting ratio.
